M EOS ν_f (Hz) τ_f (ms) νp_1 (Hz) τp_1 (s) νw_1 (Hz) τw_1 (μs) ν_wII_1 (Hz) τ_wII_1 (μs) 1.2 M⊙ APR2 1886 234 5825 4.9 12378 19.2 5493 18.3 APRB200 1906 229 6076 5.5 12465 19.2 5565 18.3 APRB120 1906 229 6079 5.5 12466 19.2 5566 18.3 BBS1 1726 281 5648 5.6 11961 19.4 4983 18.9 BBS2 2090 193 5626 1.0 12450 19.7 6002 17.6 G240 1545 356 4897 4.7 11332 19.8 4398 19.6 SS1 2526 134 10566 26.2 13747 19.7 7669 17.1 SS2 2529 134 11247 21.2 13758 19.7 7682 17.1 1.4 M⊙ APR2 1983 184 6164 4.4 11360 22.5 5906 20.2 APRB200 1997 181 6410 5.1 11407 22.6 5962 20.2 APRB120 1998 181 6413 5.0 11405 22.6 5963 20.2 BBS1 1832 213 5861 4.2 11066 22.5 5394 20.6 G240 1763 231 5055 1.9 10737 22.8 5100 20.7 SS1 2736 109 9428 4.2 11919 26.4 8594 18.8 SS2 2739 109 9467 4.4 – – – – 1.5 M⊙ APR2 2030 167 6320 4.3 10845 24.6 6125 21.2 APRB200 2041 165 6557 4.9 10879 24.6 6172 21.1 APRB120 2042 165 6501 4.9 10879 24.6 6174 21.1 BBS1 1887 190 5953 3.7 10621 24.3 5618 21.5 G240 1984 175 5176 1.0 10484 25.3 5831 20.8 1.8 M⊙ APR2 2171 137 6708 5.1 9240 34.3 6876 24.0 APRB200 2174 136 6902 6.1 9248 34.3 6896 24.0 APRB120 2229 132 6887 3.8 9223 35.8 7067 23.8 BBS1 2076 145 6178 2.9 9205 33.2 6472 24.1 2 M⊙ APR2 2280 132 6876 12.0 – – – – APRB200 2300 131 7031 11.3 – – – – BBS1 2326 131 6286 2.6 – – – – Mmax APR2 2537 172 6808 0.38 – – – – APRB200 2361 132 7013 9.7 – – – – APRB120 2401 125 6850 2.4 – – – – BBS1 2423 131 6297 2.5 – – – – BBS2 2365 153 5790 0.51 12639 20.7 6844 16.9 G240 2357 133 5460 0.49 10425 30.0 7091 20.0 SS1 2978 99 8644 1.5 – – – – SS2 2990 99 8661 1.5 – – – –

TABLE I: The frequencies and the damping times of the polar QNM for l = 2 are tabulated for assigned values of the stellar mass and for the considered EOS’s. For stellar models having M/R ≥ 0.25 (cfr. Table II) the w-mode frequency can be computed neither using the CF-algorithm nor by the continued fraction method, and the corresponding slot is left empty.